〉 _{part} N〈 0 50 100 150 200 250 300 350

AA ϕR

0

0.5

1

1.5

= 2.76 TeV NNs ALICE c < 5 GeV/ Tp 2 <

= 200 GeV NNs PHENIX c > 2.2 GeV/ Tp < 4 y Pb-Pb, 2.5 < | < 0.35y

Au-Au, | | < 0.5 y Pb-Pb, | | < 0.35y

Cu-Cu, |